-20 0 20 40 0 5 10 15 20

ms log(L_i - L_i+1)

-----TRANSCODER STATS:

-20 0 20 40 0 5 10 15 20

ms log(L)

HP Linux SBLive sense hour 35-----

-20 0 20 40 0 5 10 15 20

ms log(timer CB)

REF S/W STATS

-20 0 20 40 0 5 10 15 20

ms

TEST SW STATS

-20 0 20 40 0 5 10 15 20

-20 0 20 40 0 5 10 15 20

-20 0 20 40 0 5 10 15 20

ms log(MIDI out)

-20 0 20 40 0 5 10 15 20

ms

-20 0 20 40 0 5 10 15 20

-20 0 20 40 0 5 10 15 20

-20 0 20 40 0 5 10 15 20

ms log(MIDI in)

-20 0 20 40 0 5 10 15 20

ms